From 4fb7b8d91b1ee690eed29908170bd5789075e76b Mon Sep 17 00:00:00 2001
From: gumi <git@gumi.ca>
Date: Sat, 10 Aug 2019 17:09:18 -0400
Subject: reduce the logo shadow (looks weird in FF)

---
 src/components/Logo.vue | 9 ++++-----
 1 file changed, 4 insertions(+), 5 deletions(-)

(limited to 'src/components/Logo.vue')

diff --git a/src/components/Logo.vue b/src/components/Logo.vue
index cf7c26b..20f071e 100644
--- a/src/components/Logo.vue
+++ b/src/components/Logo.vue
@@ -29,6 +29,10 @@
 	z-index: 200;
 	max-width: calc(90% - 15vw);
 
+	&::selection {
+		text-shadow: none;
+	}
+
 	& span:last-of-type {
 		display: none;
 	}
@@ -43,11 +47,6 @@
 		height: 100px;
 		margin-top: 20px;
 		position: relative;
-		text-shadow: 0.05ch 0.09ch #070905;
-
-		&::selection {
-			text-shadow: none;
-		}
 
 		& span:first-of-type {
 			position: absolute;
-- 
cgit v1.2.3-60-g2f50

