From 60528c704e9acff79f6a0615a8621c12a7c0ebd7 Mon Sep 17 00:00:00 2001
From: skotlex <skotlex@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Tue, 5 Sep 2006 14:29:51 +0000
Subject: - Fixed connect_until field being a smallint rather than int in the
 login table (upgrade with upgrade_svn8630.sql)

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@8630 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/upgrade_svn8630.sql | 1 +
 1 file changed, 1 insertion(+)
 create mode 100644 sql-files/upgrade_svn8630.sql

(limited to 'sql-files/upgrade_svn8630.sql')

diff --git a/sql-files/upgrade_svn8630.sql b/sql-files/upgrade_svn8630.sql
new file mode 100644
index 000000000..a94dbf116
--- /dev/null
+++ b/sql-files/upgrade_svn8630.sql
@@ -0,0 +1 @@
+ALTER TABLE `login` MODIFY `connect_until` int(11) unsigned NOT NULL default '0';
-- 
cgit v1.2.3-60-g2f50

