From 60528c704e9acff79f6a0615a8621c12a7c0ebd7 Mon Sep 17 00:00:00 2001
From: skotlex <skotlex@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Tue, 5 Sep 2006 14:29:51 +0000
Subject: - Fixed connect_until field being a smallint rather than int in the
 login table (upgrade with upgrade_svn8630.sql)

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@8630 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/main.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sql-files/main.sql')

diff --git a/sql-files/main.sql b/sql-files/main.sql
index ecf8fd01b..17846b319 100644
--- a/sql-files/main.sql
+++ b/sql-files/main.sql
@@ -400,7 +400,7 @@ CREATE TABLE `login` (
   `email` varchar(60) NOT NULL default '',
   `level` tinyint(3) NOT NULL default '0',
   `error_message` smallint(11) unsigned NOT NULL default '0',
-  `connect_until` smallint(11) unsigned NOT NULL default '0',
+  `connect_until` int(11) unsigned NOT NULL default '0',
   `last_ip` varchar(100) NOT NULL default '',
   `memo` smallint(11) unsigned NOT NULL default '0',
   `ban_until` int(11) unsigned NOT NULL default '0',
-- 
cgit v1.2.3-70-g09d2

