From fe2f840e5d6cb4230ba02c47132790d067b3814d Mon Sep 17 00:00:00 2001
From: Haru <haru@dotalux.com>
Date: Tue, 27 Aug 2013 09:01:53 +0200
Subject: Corrected line endings and BOM issues with several files

- Ensured final end-of-line character in every file.
- Corrected cases of mixed line endings (mostly CR and CRLF within the
  same file.)
- Removed extra BOM  from some scripts, since it causes a parsing error.

Signed-off-by: Haru <haru@dotalux.com>
---
 sql-files/upgrades/2013-02-15--18-06.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sql-files/upgrades/2013-02-15--18-06.sql')

diff --git a/sql-files/upgrades/2013-02-15--18-06.sql b/sql-files/upgrades/2013-02-15--18-06.sql
index 066693c70..836655095 100644
--- a/sql-files/upgrades/2013-02-15--18-06.sql
+++ b/sql-files/upgrades/2013-02-15--18-06.sql
@@ -1,3 +1,3 @@
 #1360951560
 ALTER TABLE `sql_updates` ADD PRIMARY KEY(`timestamp`);
-INSERT INTO `sql_updates` (`timestamp`) VALUES (1360951560);
\ No newline at end of file
+INSERT INTO `sql_updates` (`timestamp`) VALUES (1360951560);
-- 
cgit v1.2.3-60-g2f50

