From fd3e05f2efdfb6844cb213658213d782cbbd9af2 Mon Sep 17 00:00:00 2001
From: skotlex <skotlex@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Tue, 14 Mar 2006 21:30:24 +0000
Subject: - Fixed the average_lv column size specification. Thanks to Joshuaali
 (upgrade_svn5607.sql)

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@5603 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/upgrade_svn5607.sql | 1 +
 1 file changed, 1 insertion(+)
 create mode 100644 sql-files/upgrade_svn5607.sql

(limited to 'sql-files/upgrade_svn5607.sql')

diff --git a/sql-files/upgrade_svn5607.sql b/sql-files/upgrade_svn5607.sql
new file mode 100644
index 000000000..7c3f88527
--- /dev/null
+++ b/sql-files/upgrade_svn5607.sql
@@ -0,0 +1 @@
+ALTER TABLE `guild` MODIFY `average_lv` smallint(6) unsigned NOT NULL default '1';
-- 
cgit v1.2.3-70-g09d2

