From f819d835b92f15e98f91cc0808f260f2be6d4f06 Mon Sep 17 00:00:00 2001
From: Playtester <Playtester@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Mon, 1 Oct 2007 08:20:51 +0000
Subject: Small sql update

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@11339 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/mob_db.sql | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'sql-files/mob_db.sql')

diff --git a/sql-files/mob_db.sql b/sql-files/mob_db.sql
index 7cd562c38..3bf40e990 100644
--- a/sql-files/mob_db.sql
+++ b/sql-files/mob_db.sql
@@ -748,16 +748,16 @@ REPLACE INTO `mob_db` VALUES (1664,'POTON_CANON','Photon Cannon','Photon Cannon'
 REPLACE INTO `mob_db` VALUES (1665,'POTON_CANON_1','Photon Cannon','Photon Cannon',67,7500,0,4300,2000,9,700,800,15,30,1,40,30,40,86,80,10,12,1,0,40,0x84,300,1536,960,480,0,0,0,0,0,0,0,0,7126,5000,726,1000,938,1000,13160,5,0,0,0,0,0,0,0,0,0,0,0,0);
 REPLACE INTO `mob_db` VALUES (1666,'POTON_CANON_2','Photon Cannon','Photon Cannon',64,7100,0,3100,2700,9,800,900,8,30,1,40,21,29,80,91,10,12,1,0,40,0x84,300,1536,960,480,0,0,0,0,0,0,0,0,7126,5000,721,1000,938,1000,0,0,0,0,0,0,0,0,0,0,0,0,0,0);
 REPLACE INTO `mob_db` VALUES (1667,'POTON_CANON_3','Photon Cannon','Photon Cannon',65,7800,0,3800,2300,9,700,800,15,30,1,40,23,30,90,99,10,12,1,0,40,0x84,300,1536,960,480,0,0,0,0,0,0,0,0,7126,5000,728,1000,938,1000,0,0,0,0,0,0,0,0,0,0,0,0,0,0);
-REPLACE INTO `mob_db` VALUES (1668,'ARCHDAM','Archdam','Archdam',79,25000,0,8000,5000,3,1000,2000,15,15,65,65,35,75,75,15,10,12,2,7,60,0x3695,180,580,288,360,0,0,0,0,0,0,0,0,7317,5000,999,500,984,200,985,200,13156,5,0,0,0,0,0,0,0,0,4371,1);
+REPLACE INTO `mob_db` VALUES (1668,'ARCHDAM','Archdam','Archdam',79,25000,0,8000,5000,3,1000,2000,15,15,65,65,35,75,75,15,10,12,2,7,60,0x3695,180,580,288,360,0,0,0,0,0,0,0,0,7317,5000,999,500,984,200,985,200,13156,5,0,0,0,0,13167,5,0,0,4371,1);
 REPLACE INTO `mob_db` VALUES (1669,'DIMIK','Dimik','Dimik',77,10000,0,0,0,5,1040,1880,45,28,15,35,40,15,120,42,10,12,1,0,40,0x3885,200,576,720,432,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0);
 REPLACE INTO `mob_db` VALUES (1670,'DIMIK_1','Dimik','Dimik',79,16000,0,6400,3500,7,1140,1980,45,28,15,88,20,20,120,40,10,12,1,0,44,0x3885,150,576,720,432,0,0,0,0,0,0,0,0,7319,2000,7352,50,999,300,7094,300,13153,5,984,10,12128,50,0,0,0,0,4370,1);
 REPLACE INTO `mob_db` VALUES (1671,'DIMIK_2','Dimik','Dimik',89,29000,0,8000,5000,5,1440,2280,45,28,15,40,30,30,150,70,10,12,1,0,41,0x3885,200,576,720,432,0,0,0,0,0,0,0,0,7319,2000,7353,50,999,300,7094,300,2656,10,984,10,12128,50,0,0,0,0,4370,1);
-REPLACE INTO `mob_db` VALUES (1672,'DIMIK_3','Dimik','Dimik',80,19000,0,5900,2800,5,1240,2080,68,28,15,30,78,20,120,30,10,12,1,0,42,0x3885,200,576,720,432,0,0,0,0,0,0,0,0,7319,2000,7354,50,999,300,7094,300,2656,10,984,10,12128,50,0,0,0,0,4370,1);
+REPLACE INTO `mob_db` VALUES (1672,'DIMIK_3','Dimik','Dimik',80,19000,0,5900,2800,5,1240,2080,68,28,15,30,78,20,120,30,10,12,1,0,42,0x3885,200,576,720,432,0,0,0,0,0,0,0,0,7319,2000,7354,50,999,300,7094,300,2656,10,984,10,12128,50,13169,5,0,0,4370,1);
 REPLACE INTO `mob_db` VALUES (1673,'DIMIK_4','Dimik','Dimik',82,13900,0,5800,4500,5,1840,2840,45,28,15,20,20,10,120,30,10,12,1,0,43,0x3885,200,576,720,432,0,0,0,0,0,0,0,0,7319,2000,7355,50,999,300,7094,300,2656,10,984,10,12128,50,0,0,0,0,4370,1);
 REPLACE INTO `mob_db` VALUES (1674,'MONEMUS','Monemus','Monemus',88,80000,0,0,0,5,2000,3000,54,25,0,1,90,24,144,45,14,12,2,0,63,0x1A4,400,1368,1344,432,0,0,0,0,0,0,0,0,7049,2000,953,1000,7049,0,7049,0,7049,0,7049,0,7049,0,7049,0,0,0,0,0);
 REPLACE INTO `mob_db` VALUES (1675,'VENATU','Venatu','Venatu',77,8000,0,0,0,2,1200,1800,35,20,5,26,24,5,75,40,10,12,1,0,43,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,0);
 REPLACE INTO `mob_db` VALUES (1676,'VENATU_1','Venatu','Venatu',72,8900,0,4000,2000,2,800,1400,30,20,5,26,24,5,82,30,10,12,1,0,40,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,7317,2000,7356,350,999,300,7094,300,13157,5,985,10,12127,100,0,0,0,0,4369,1);
-REPLACE INTO `mob_db` VALUES (1677,'VENATU_2','Venatu','Venatu',80,9000,0,4000,2000,2,900,1500,30,20,5,82,32,5,105,30,10,12,1,0,44,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,7317,2000,7357,500,999,300,7094,300,2656,10,985,10,12127,100,0,0,0,0,4369,1);
+REPLACE INTO `mob_db` VALUES (1677,'VENATU_2','Venatu','Venatu',80,9000,0,4000,2000,2,900,1500,30,20,5,82,32,5,105,30,10,12,1,0,44,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,7317,2000,7357,500,999,300,7094,300,2656,10,985,10,12127,100,13164,5,0,0,4369,1);
 REPLACE INTO `mob_db` VALUES (1678,'VENATU_3','Venatu','Venatu',78,9500,0,4500,2000,2,800,1400,30,20,5,26,68,5,95,30,10,12,1,0,42,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,7317,2000,7358,400,999,300,7094,300,2656,10,985,10,12127,100,0,0,0,0,4369,1);
 REPLACE INTO `mob_db` VALUES (1679,'VENATU_4','Venatu','Venatu',75,12300,0,4000,2000,2,800,1400,30,20,5,26,24,5,100,30,10,12,1,0,41,0x3885,150,504,1020,360,0,0,0,0,0,0,0,0,7317,2000,7359,300,999,300,7094,300,2656,10,985,10,12127,100,0,0,0,0,4369,1);
 REPLACE INTO `mob_db` VALUES (1680,'HILL_WIND_1','Hill Wind','Hill Wind',45,4233,0,2132,1722,3,320,510,10,15,21,42,31,50,67,23,10,12,1,2,64,0x3885,170,504,480,360,0,0,0,0,0,0,0,0,7115,4000,7116,3000,528,1000,510,10,0,0,0,0,0,0,0,0,0,0,4345,1);
-- 
cgit v1.2.3-70-g09d2

