From de678dc8a2d4450a91f9b4c2a205b294a8b678eb Mon Sep 17 00:00:00 2001
From: Gepard <Gepard@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Fri, 15 Apr 2011 09:50:13 +0000
Subject: * Fixed some `mob_db` columns being too small for currently used
 values (bugreport:4866, since r14727).

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@14794 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/mob_db.sql | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'sql-files/mob_db.sql')

diff --git a/sql-files/mob_db.sql b/sql-files/mob_db.sql
index 5f7592248..65630e76b 100644
--- a/sql-files/mob_db.sql
+++ b/sql-files/mob_db.sql
@@ -18,12 +18,12 @@ CREATE TABLE `mob_db` (
   `ATK2` smallint(6) unsigned NOT NULL default '0',
   `DEF` smallint(6) unsigned NOT NULL default '0',
   `MDEF` smallint(6) unsigned NOT NULL default '0',
-  `STR` tinyint(4) unsigned NOT NULL default '0',
-  `AGI` tinyint(4) unsigned NOT NULL default '0',
-  `VIT` tinyint(4) unsigned NOT NULL default '0',
-  `INT` tinyint(4) unsigned NOT NULL default '0',
-  `DEX` tinyint(4) unsigned NOT NULL default '0',
-  `LUK` tinyint(4) unsigned NOT NULL default '0',
+  `STR` smallint(6) unsigned NOT NULL default '0',
+  `AGI` smallint(6) unsigned NOT NULL default '0',
+  `VIT` smallint(6) unsigned NOT NULL default '0',
+  `INT` smallint(6) unsigned NOT NULL default '0',
+  `DEX` smallint(6) unsigned NOT NULL default '0',
+  `LUK` smallint(6) unsigned NOT NULL default '0',
   `Range2` tinyint(4) unsigned NOT NULL default '0',
   `Range3` tinyint(4) unsigned NOT NULL default '0',
   `Scale` tinyint(4) unsigned NOT NULL default '0',
-- 
cgit v1.2.3-60-g2f50

