From a50c6281bbad73cd4155cbf55af4c899c9e2d1ea Mon Sep 17 00:00:00 2001
From: ultramage <ultramage@54d463be-8e91-2dee-dedb-b68131a5f0ec>
Date: Fri, 1 Aug 2008 07:05:16 +0000
Subject: Removed unused guardian hp columns from the guild castles table in
 main.sql (should have been done in r11915). Corrected incorrect use of the
 datetime column in the `login` table (bugreport:1962). Refreshed txt account
 savefile. Cleaned up some random minor source code glitches.

git-svn-id: https://rathena.svn.sourceforge.net/svnroot/rathena/trunk@13030 54d463be-8e91-2dee-dedb-b68131a5f0ec
---
 sql-files/main.sql | 8 --------
 1 file changed, 8 deletions(-)

(limited to 'sql-files/main.sql')

diff --git a/sql-files/main.sql b/sql-files/main.sql
index 5b9f1a313..172312f8f 100644
--- a/sql-files/main.sql
+++ b/sql-files/main.sql
@@ -239,14 +239,6 @@ CREATE TABLE `guild_castle` (
   `visibleG5` int(11) unsigned NOT NULL default '0',
   `visibleG6` int(11) unsigned NOT NULL default '0',
   `visibleG7` int(11) unsigned NOT NULL default '0',
-  `gHP0` int(11) unsigned NOT NULL default '0',
-  `ghP1` int(11) unsigned NOT NULL default '0',
-  `gHP2` int(11) unsigned NOT NULL default '0',
-  `gHP3` int(11) unsigned NOT NULL default '0',
-  `gHP4` int(11) unsigned NOT NULL default '0',
-  `gHP5` int(11) unsigned NOT NULL default '0',
-  `gHP6` int(11) unsigned NOT NULL default '0',
-  `gHP7` int(11) unsigned NOT NULL default '0',
   PRIMARY KEY  (`castle_id`),
   KEY `guild_id` (`guild_id`)
 ) ENGINE=MyISAM;
-- 
cgit v1.2.3-60-g2f50

